ALTER TABLE `simulation_pool` ADD COLUMN `iconFile` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '分析项库图标文件Id' AFTER `parentVersion`;