/*
 Navicat Premium Dump SQL

 Source Server         : 基线版本
 Source Server Type    : MySQL
 Source Server Version : 80043 (8.0.43)
 Source Host           : 192.168.65.161:3306
 Source Schema         : spdm_baseline

 Target Server Type    : MySQL
 Target Server Version : 80043 (8.0.43)
 File Encoding         : 65001

 Date: 03/02/2026 18:51:57
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for system_param_config
-- ----------------------------
DROP TABLE IF EXISTS `system_param_config`;
CREATE TABLE `system_param_config`  (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `paramName` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '系统参数名称',
  `paramValue` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '系统参数值',
  `tenantId` bigint NOT NULL DEFAULT 0 COMMENT '租户ID',
  `creator` bigint NOT NULL DEFAULT 0 COMMENT '创建者',
  `createTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 116 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_unicode_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
