/*
 Navicat Premium Dump SQL

 Source Server         : 基线版本
 Source Server Type    : MySQL
 Source Server Version : 80043 (8.0.43)
 Source Host           : 192.168.65.161:3306
 Source Schema         : spdm_baseline

 Target Server Type    : MySQL
 Target Server Version : 80043 (8.0.43)
 File Encoding         : 65001

 Date: 27/01/2026 13:54:35
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for simulation_approve_flow_map
-- ----------------------------
DROP TABLE IF EXISTS `simulation_approve_flow_map`;
CREATE TABLE `simulation_approve_flow_map`  (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `moduleName` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '审批模块名称',
  `moduleCode` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '审批模块编码',
  `flowName` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '审批流名称',
  `flowCode` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '审批流编号',
  `tenantId` bigint NOT NULL DEFAULT 0 COMMENT '所属租户',
  `creator` bigint NOT NULL DEFAULT 0 COMMENT '创建人',
  `createTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 3 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_unicode_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
