CREATE TABLE `simulation_report_template` (
                                              `id` bigint NOT NULL AUTO_INCREMENT,
                                              `uuid` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '报告模版唯一ID',
                                              `templateName` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT '' COMMENT '报告模版名称',
                                              `templateVersion` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT '' COMMENT '报告模版版本',
                                              `templateContent` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci COMMENT '报告模版信息',
                                              `fileId` bigint DEFAULT NULL COMMENT '报告模板绑定文件ID',
                                              `templateStatus` tinyint DEFAULT '-1' COMMENT '报告模版状态 -1:草稿 0：禁用 1：启用',
                                              `templateType` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT '' COMMENT '报告模版类型（分析方向）',
                                              `approveType` tinyint DEFAULT '0' COMMENT '报告模版审批状态 0：未审批 1：审批中 2：审批通过 3：审批未通过',
                                              `approveFlowId` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT '' COMMENT '报告模版评审流ID',
                                              `comment` mediumtext CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci COMMENT '报告模版描述信息',
                                              `tenantId` bigint NOT NULL DEFAULT '0' COMMENT '租户ID',
                                              `updateTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP COMMENT '更新时间',
                                              `creator` bigint NOT NULL DEFAULT '0' COMMENT '模版创建者ID',
                                              `createTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '模版创建时间',
                                              `updater` bigint DEFAULT '0' COMMENT '模版更新人ID',
                                              PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=8 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='报告模板';